---
sidebar_position: 4
slug: /status-bar
---

import Tabs from '@theme/Tabs';
import TabItem from '@theme/TabItem';

import UppyCdnExample from '/src/components/UppyCdnExample';

# Status bar

The `@uppy/status-bar` plugin shows upload progress and speed, estimated time,
pre- and post-processing information, and allows users to control
(pause/resume/cancel) the upload.

:::tip

Try it out together with [`@uppy/drag-drop`](/docs/drag-drop) in
[StackBlitz](https://stackblitz.com/edit/vitejs-vite-yzbujq?file=main.js/g)

:::

## When should I use it?

When you use the [Dashboard](/docs/dashboard) it’s already included by default.
This plugin is published separately but made specifically for the Dashboard. You
can still use it without it but it may need some (CSS) tweaking for your use
case.

## Install

<Tabs>
  <TabItem value="npm" label="NPM" default>

```shell
npm install @uppy/status-bar
```

  </TabItem>

  <TabItem value="yarn" label="Yarn">

```shell
yarn add @uppy/status-bar
```

  </TabItem>

  <TabItem value="cdn" label="CDN">
    <UppyCdnExample>
      {`
        import { Uppy, StatusBar } from "{{UPPY_JS_URL}}"
        const uppy = new Uppy()
        uppy.use(StatusBar, { target: '#status-bar' })
      `}
    </UppyCdnExample>
  </TabItem>
</Tabs>

## Use

```js showLineNumbers
import Uppy from '@uppy/core';
import StatusBar from '@uppy/status-bar';

import '@uppy/core/dist/style.min.css';
import '@uppy/status-bar/dist/style.min.css';

new Uppy().use(StatusBar, { target: '#status-bar' });
```

## API

### Options

#### `id`

A unique identifier for this Status Bar (`string`, default: `'StatusBar'`).

Use this if you need to add several StatusBar instances.

#### `target`

DOM element, CSS selector, or plugin to mount the Status Bar into (`Element`,
`string`, `UIPlugin`, default: `'body'`).

#### `hideAfterFinish`

Hide the Status Bar after the upload is complete (`boolean`, default: `true`).

#### `showProgressDetails`

Display remaining upload size and estimated time (`boolean`, default: `false`)

:::note

`false`: Uploading: 45%

`true`: Uploading: 45%・43 MB of 101 MB・8s left

:::

#### `hideUploadButton`

Hide the upload button (`boolean`, default: `false`).

Use this if you are providing a custom upload button somewhere, and using the
`uppy.upload()` API.

#### `hideRetryButton`

Hide the retry button (`boolean`, default: `false`).

Use this if you are providing a custom retry button somewhere, and using the
`uppy.retryAll()` or `uppy.retryUpload(fileID)` API.

#### `hidePauseResumeButton`

Hide pause/resume buttons (for resumable uploads, via [tus](http://tus.io), for
example) (`boolean`, default: `false`).

Use this if you are providing custom cancel or pause/resume buttons somewhere,
and using the `uppy.pauseResume(fileID)` or `uppy.removeFile(fileID)` API.

#### `hideCancelButton`

Hide the cancel button (`boolean`, default: `false`).

Use this if you are providing a custom retry button somewhere, and using the
`uppy.cancelAll()` API.

#### `doneButtonHandler`

Status Bar will render a “Done” button in place of pause/resume/cancel buttons,
once the upload/encoding is done (`Function`, default: `null`).

The behaviour of this “Done” button is defined by the handler function — can be
used to close file picker modals or clear the upload state. This is what the
Dashboard plugin, which uses Status Bar internally, sets:

```js
const doneButtonHandler = () => {
	this.uppy.reset();
	this.requestCloseModal();
};
```

#### `locale`

```js
export default {
	strings: {
		// Shown in the status bar while files are being uploaded.
		uploading: 'Uploading',
		// Shown in the status bar once all files have been uploaded.
		complete: 'Complete',
		// Shown in the status bar if an upload failed.
		uploadFailed: 'Upload failed',
		// Shown in the status bar while the upload is paused.
		paused: 'Paused',
		// Used as the label for the button that retries an upload.
		retry: 'Retry',
		// Used as the label for the button that cancels an upload.
		cancel: 'Cancel',
		// Used as the label for the button that pauses an upload.
		pause: 'Pause',
		// Used as the label for the button that resumes an upload.
		resume: 'Resume',
		// Used as the label for the button that resets the upload state after an upload
		done: 'Done',
		// When `showProgressDetails` is set, shows the number of files that have been fully uploaded so far.
		filesUploadedOfTotal: {
			0: '%{complete} of %{smart_count} file uploaded',
			1: '%{complete} of %{smart_count} files uploaded',
		},
		// When `showProgressDetails` is set, shows the amount of bytes that have been uploaded so far.
		dataUploadedOfTotal: '%{complete} of %{total}',
		// When `showProgressDetails` is set, shows an estimation of how long the upload will take to complete.
		xTimeLeft: '%{time} left',
		// Used as the label for the button that starts an upload.
		uploadXFiles: {
			0: 'Upload %{smart_count} file',
			1: 'Upload %{smart_count} files',
		},
		// Used as the label for the button that starts an upload, if another upload has been started in the past
		// and new files were added later.
		uploadXNewFiles: {
			0: 'Upload +%{smart_count} file',
			1: 'Upload +%{smart_count} files',
		},
		upload: 'Upload',
		retryUpload: 'Retry upload',
		xMoreFilesAdded: {
			0: '%{smart_count} more file added',
			1: '%{smart_count} more files added',
		},
		showErrorDetails: 'Show error details',
	},
};
```
